UUR17A_NMR_em_bcr3_07_ch2distrb.ps ** Selected residues only

Chi-2 frequency distributions UUR17A_NMR_em_bcr3 (20 models)**

g- t g+ g- t g+ g- t g+ g- t g+

Page 1

PROCHECK-NMR

4 8 12 16 A ASN 6 cv 0.282 A GLU 7 cv 0.007 A ASP 8 cv 0.638 A PHE 9 cv 0.384

4 8 12 16 A LYS 10 cv 0.004 A LYS 11 cv 0.224 A ILE 12 cv 0.000 A ASN 14 cv 0.047

4 8 12 16 A ASN 15 cv 0.241 A ILE 16 cv 0.000 A ARG 17 cv 0.004 A LEU 18 cv 0.002

4 8 12 16 A LYS 19 cv 0.407 A ASP 20 cv 0.457 A PHE 22 cv 0.005 A ASP 23 cv 0.561

4 8 12 16 A PHE 24 cv 0.004 A LYS 25 cv 0.072 A LEU 26 cv 0.001 A PHE 29 cv 0.004

4 8 12 16 A ASN 31 cv 0.433 A GLN 32 cv 0.651 A ASN 33 cv 0.268 A TYR 34 cv 0.206

4 8 12 16 A ASP 35 cv 0.666 A GLN 36 cv 0.426 A LEU 37 cv 0.080 A LEU 38 cv 0.645

4 8 12 16 A GLN 41 cv 0.227 A ILE 42 cv 0.000 A TYR 43 cv 0.106 A LYS 44 cv 0.460

4 8 12 16 A ASN 45 cv 0.791 A TYR 46 cv 0.491 A TYR 47 cv 0.558 A GLN 48 cv 0.450

0 60 120 180 240 300 0 4 8 12 16 A ILE 50 cv 0.001

0 60 120 180 240 300

A GLU 51 cv 0.514

0 60 120 180 240 300

A ILE 52 cv 0.000

0 60 120 180 240 300 360

A GLN 53 cv 0.688

Chi-2 (degrees)

Frequency

cv = Circular Variance (low values signify high clustering of the data points). Accessible Buried

UUR17A_NMR_em_bcr3_07_ch2distrb.ps ** Selected residues only

Chi-2 frequency distributions UUR17A_NMR_em_bcr3 (20 models)**

g- t g+ g- t g+ g- t g+ g- t g+

Page 2

PROCHECK-NMR

4 8 12 16 A GLN 54 cv 0.508 A HIS 55 cv 0.558 A GLU 60 cv 0.448 A LEU 61 cv 0.197

4 8 12 16 A ASP 62 cv 0.380 A ILE 63 cv 0.001 A LYS 64 cv 0.424 A ILE 65 cv 0.000

4 8 12 16 A ILE 66 cv 0.000 A ASN 67 cv 0.602 A PHE 68 cv 0.495 A LEU 69 cv 0.310

4 8 12 16 A TYR 70 cv 0.068 A ASP 74 cv 0.214 A PHE 75 cv 0.200 A ASN 79 cv 0.576

4 8 12 16 A LYS 80 cv 0.008 A ASN 81 cv 0.465 A LEU 84 cv 0.591 A LYS 85 cv 0.290

4 8 12 16 A LEU 86 cv 0.578 A LEU 88 cv 0.210 A MET 89 cv 0.056 A LEU 90 cv 0.001

4 8 12 16 A ASP 92 cv 0.696 A LYS 93 cv 0.164 A LYS 94 cv 0.207 A ASN 95 cv 0.640

4 8 12 16 A ASN 96 cv 0.260 A GLN 97 cv 0.002 A TYR 99 cv 0.008 A TYR 100 cv 0.034

4 8 12 16 A LYS 101 cv 0.012 A LEU 102 cv 0.519 A LEU 103 cv 0.147 A GLU 104 cv 0.198

0 60 120 180 240 300 0 4 8 12 16 A PHE 108 cv 0.382

0 60 120 180 240 300

A ASN 111 cv 0.291

0 60 120 180 240 300

A TYR 113 cv 0.585

0 60 120 180 240 300 360

A LEU 114 cv 0.000

Chi-2 (degrees)

Frequency

cv = Circular Variance (low values signify high clustering of the data points). Accessible Buried