SR478_NMR_em_bcr3_07_ch2distrb.ps ** Selected residues only

Chi-2 frequency distributions SR478_NMR_em_bcr3 (20 models)**

g- t g+ g- t g+ g- t g+ g- t g+

Page 1

PROCHECK-NMR

3 6 9 12 M TYR 9 cv 0.395 M PHE 10 cv 0.089 M ILE 11 cv 0.009 M GLU 12 cv 0.480

3 6 9 12 M ASN 13 cv 0.157 M LEU 14 cv 0.206 M LYS 15 cv 0.261 M GLN 16 cv 0.001

3 6 9 12 M HIS 17 cv 0.946 M ILE 18 cv 0.002 M GLU 19 cv 0.714 M MET 20 cv 0.112

3 6 9 12 M GLU 24 cv 0.003 M ASP 25 cv 0.002 M LYS 26 cv 0.001 M ILE 27 cv 0.493

3 6 9 12 M HIS 28 cv 0.707 M MET 30 cv 0.528 M ASN 31 cv 0.701 M TYR 33 cv 0.596

3 6 9 12 M TYR 34 cv 0.766 M ARG 35 cv 0.334 M LEU 41 cv 0.453 M LYS 48 cv 0.235

3 6 9 12 M ASN 49 cv 0.856 M LEU 53 cv 0.706 M LYS 54 cv 0.142 M ARG 55 cv 0.651

3 6 9 12 M ILE 56 cv 0.556 M GLN 57 cv 0.427 M HIS 58 cv 0.661 M LEU 59 cv 0.382

3 6 9 12 M ASP 60 cv 0.190 M GLU 61 cv 0.001 M TYR 63 cv 0.581 M ASN 64 cv 0.556

0 60 120 180 240 300 0 3 6 9 12 M LYS 65 cv 0.772

0 60 120 180 240 300

M LYS 67 cv 0.062

0 60 120 180 240 300

M ARG 68 cv 0.304

0 60 120 180 240 300 360

M TYR 99 cv 0.405

Chi-2 (degrees)

Frequency

cv = Circular Variance (low values signify high clustering of the data points). Accessible Buried

SR478_NMR_em_bcr3_07_ch2distrb.ps ** Selected residues only

Chi-2 frequency distributions SR478_NMR_em_bcr3 (20 models)**

g- t g+ g- t g+ g- t g+ g- t g+

Page 2

PROCHECK-NMR

3 6 9 12 M PHE 100 cv 0.166 M ILE 101 cv 0.003 M GLU 102 cv 0.398 M ASN 103 cv 0.823

3 6 9 12 M LEU 104 cv 0.328 M LYS 105 cv 0.162 M GLN 106 cv 0.004 M HIS 107 cv 0.865

3 6 9 12 M ILE 108 cv 0.001 M GLU 109 cv 0.583 M GLN 112 cv 0.401 M GLU 114 cv 0.000

3 6 9 12 M ASP 115 cv 0.017 M LYS 116 cv 0.002 M ILE 117 cv 0.505 M HIS 118 cv 0.810

3 6 9 12 M MET 120 cv 0.509 M ASN 121 cv 0.680 M TYR 123 cv 0.689 M TYR 124 cv 0.397

3 6 9 12 M ARG 125 cv 0.295 M LEU 131 cv 0.574 M LYS 138 cv 0.247 M ASN 139 cv 0.769

3 6 9 12 M LEU 143 cv 0.573 M LYS 144 cv 0.175 M ARG 145 cv 0.742 M ILE 146 cv 0.494

3 6 9 12 M GLN 147 cv 0.339 M HIS 148 cv 0.801 M LEU 149 cv 0.646 M ASP 150 cv 0.318

3 6 9 12 M GLU 151 cv 0.002 M TYR 153 cv 0.474 M ASN 154 cv 0.597

0 60 120 180 240 300 360

M LYS 155 cv 0.746

0 60 120 180 240 300 0 3 6 9 12 M LYS 157 cv 0.085

0 60 120 180 240 300 360

M ARG 158 cv 0.513

Chi-2 (degrees)

Frequency

cv = Circular Variance (low values signify high clustering of the data points). Accessible Buried