SOR77_R3Cons_em_bcr3_07_ch2distrb.ps ** Selected residues only

Chi-2 frequency distributions SOR77_R3Cons_em_bcr3 (18 models)**

g- t g+ g- t g+ g- t g+ g- t g+

Page 1

PROCHECK-NMR

4 8 12 16 M ASN 9 cv 0.093 M GLN 11 cv 0.150 M GLU 13 cv 0.001 M LEU 15 cv 0.010

4 8 12 16 M ILE 16 cv 0.000 M GLU 18 cv 0.474 M ILE 19 cv 0.000 M LEU 20 cv 0.000

4 8 12 16 M LEU 23 cv 0.001 M GLU 24 cv 0.075 M LYS 25 cv 0.005 M HIS 26 cv 0.008

4 8 12 16 M LYS 27 cv 0.000 M ASP 31 cv 0.000 M LEU 32 cv 0.001 M LEU 34 cv 0.001

4 8 12 16 M MET 35 cv 0.366 M LEU 37 cv 0.189 M ASN 39 cv 0.031 M HIS 43 cv 0.001

4 8 12 16 M LEU 44 cv 0.001 M LEU 45 cv 0.082 M GLU 46 cv 0.080 M ARG 47 cv 0.175

4 8 12 16 M LYS 48 cv 0.076 M GLU 52 cv 0.000 M ARG 54 cv 0.013 M GLN 55 cv 0.002

4 8 12 16 M GLU 59 cv 0.003 M GLN 60 cv 0.085 M PHE 61 cv 0.438 M LYS 63 cv 0.000

4 8 12 16 M LEU 65 cv 0.021 M GLN 67 cv 0.161 M LYS 70 cv 0.001 M ASN 72 cv 0.001

0 60 120 180 240 300 0 4 8 12 16 M LEU 73 cv 0.081

0 60 120 180 240 300

M ASN 99 cv 0.093

0 60 120 180 240 300

M GLN 101 cv 0.150

0 60 120 180 240 300 360

M GLU 103 cv 0.001

Chi-2 (degrees)

Frequency

cv = Circular Variance (low values signify high clustering of the data points). Accessible Buried

SOR77_R3Cons_em_bcr3_07_ch2distrb.ps ** Selected residues only

Chi-2 frequency distributions SOR77_R3Cons_em_bcr3 (18 models)**

g- t g+ g- t g+ g- t g+ g- t g+

Page 2

PROCHECK-NMR

4 8 12 16 M LEU 105 cv 0.010 M ILE 106 cv 0.000 M GLU 108 cv 0.474 M ILE 109 cv 0.000

4 8 12 16 M LEU 110 cv 0.000 M LEU 113 cv 0.001 M GLU 114 cv 0.075 M LYS 115 cv 0.005

4 8 12 16 M HIS 116 cv 0.008 M LYS 117 cv 0.000 M ASP 121 cv 0.000 M LEU 122 cv 0.001

4 8 12 16 M LEU 124 cv 0.001 M MET 125 cv 0.366 M LEU 127 cv 0.189 M ASN 129 cv 0.031

4 8 12 16 M HIS 133 cv 0.001 M LEU 134 cv 0.001 M LEU 135 cv 0.082 M GLU 136 cv 0.080

4 8 12 16 M ARG 137 cv 0.175 M LYS 138 cv 0.076 M GLU 142 cv 0.000 M ARG 144 cv 0.013

4 8 12 16 M GLN 145 cv 0.002 M GLU 149 cv 0.003 M GLN 150 cv 0.085 M PHE 151 cv 0.438

4 8 12 16 M LYS 153 cv 0.000 M LEU 155 cv 0.021 M GLN 157 cv 0.161

0 60 120 180 240 300 360

M LYS 160 cv 0.001

0 60 120 180 240 300 0 4 8 12 16 M ASN 162 cv 0.001

0 60 120 180 240 300 360

M LEU 163 cv 0.081

Chi-2 (degrees)

Frequency

cv = Circular Variance (low values signify high clustering of the data points). Accessible Buried