MBR242E_R3Cons_em_bcr3_07_ch2distrb.ps ** Selected residues only

Chi-2 frequency distributions MBR242E_R3Cons_em_bcr3 (18 models)**

g- t g+ g- t g+ g- t g+ g- t g+

Page 1

PROCHECK-NMR

5 10 15 20 M ARG 7 cv 0.001 M LYS 8 cv 0.078 M LEU 11 cv 0.213 M LEU 12 cv 0.001

5 10 15 20 M ASP 13 cv 0.000 M GLN 14 cv 0.241 M ARG 17 cv 0.015 M LYS 20 cv 0.001

5 10 15 20 M LEU 22 cv 0.000 M ARG 26 cv 0.433 M ARG 27 cv 0.014 M LEU 28 cv 0.004

5 10 15 20 M GLN 29 cv 0.001 M ILE 30 cv 0.085 M LEU 31 cv 0.000 M ASP 32 cv 0.095

5 10 15 20 M LEU 33 cv 0.140 M LEU 34 cv 0.001 M GLN 36 cv 0.002 M GLU 38 cv 0.003

5 10 15 20 M ARG 39 cv 0.064 M GLU 42 cv 0.001 M ILE 44 cv 0.000 M MET 50 cv 0.004

5 10 15 20 M ASN 51 cv 0.080 M LEU 52 cv 0.155 M ASN 58 cv 0.031 M LEU 59 cv 0.000

5 10 15 20 M GLN 60 cv 0.623 M LEU 62 cv 0.000 M LYS 63 cv 0.005 M GLU 69 cv 0.126

5 10 15 20 M ARG 71 cv 0.416 M ARG 72 cv 0.074 M GLU 73 cv 0.138 M ARG 76 cv 0.002

0 60 120 180 240 300 0 5 10 15 20 M GLN 77 cv 0.004

0 60 120 180 240 300

M TYR 78 cv 0.002

0 60 120 180 240 300

M TYR 79 cv 0.000

0 60 120 180 240 300 360

M ARG 80 cv 0.258

Chi-2 (degrees)

Frequency

cv = Circular Variance (low values signify high clustering of the data points). Accessible Buried

MBR242E_R3Cons_em_bcr3_07_ch2distrb.ps ** Selected residues only

Chi-2 frequency distributions MBR242E_R3Cons_em_bcr3 (18 models)**

g- t g+ g- t g+ g- t g+ g- t g+

Page 2

PROCHECK-NMR

5 10 15 20 M ILE 81 cv 0.299 M GLU 84 cv 0.001 M ASP 85 cv 0.018 M ARG 88 cv 0.001

5 10 15 20 M LEU 89 cv 0.146 M PHE 90 cv 0.001 M LEU 92 cv 0.000 M GLN 94 cv 0.001

5 10 15 20 M ASP 98 cv 0.101 M GLU 99 cv 0.535 M HIS 100 cv 0.372 M LEU 101 cv 0.461

5 10 15 20 M ARG 125 cv 0.001 M LYS 126 cv 0.078 M LEU 129 cv 0.213 M LEU 130 cv 0.001

5 10 15 20 M ASP 131 cv 0.000 M GLN 132 cv 0.241 M ARG 135 cv 0.015 M LYS 138 cv 0.001

5 10 15 20 M LEU 140 cv 0.000 M ARG 144 cv 0.433 M ARG 145 cv 0.014 M LEU 146 cv 0.004

5 10 15 20 M GLN 147 cv 0.001 M ILE 148 cv 0.085 M LEU 149 cv 0.000 M ASP 150 cv 0.095

5 10 15 20 M LEU 151 cv 0.141 M LEU 152 cv 0.001 M GLN 154 cv 0.002 M GLU 156 cv 0.003

5 10 15 20 M ARG 157 cv 0.064 M GLU 160 cv 0.001 M ILE 162 cv 0.000 M MET 168 cv 0.004

0 60 120 180 240 300 0 5 10 15 20 M ASN 169 cv 0.080

0 60 120 180 240 300

M LEU 170 cv 0.155

0 60 120 180 240 300

M ASN 176 cv 0.031

0 60 120 180 240 300 360

M LEU 177 cv 0.000

Chi-2 (degrees)

Frequency

cv = Circular Variance (low values signify high clustering of the data points). Accessible Buried

MBR242E_R3Cons_em_bcr3_07_ch2distrb.ps ** Selected residues only

Chi-2 frequency distributions MBR242E_R3Cons_em_bcr3 (18 models)**

g- t g+ g- t g+ g- t g+ g- t g+

Page 3

PROCHECK-NMR

5 10 15 20 M GLN 178 cv 0.623 M LEU 180 cv 0.000 M LYS 181 cv 0.005 M LEU 185 cv 0.568

5 10 15 20 M GLU 187 cv 0.126 M ARG 189 cv 0.416 M ARG 190 cv 0.074 M GLU 191 cv 0.138

5 10 15 20 M ARG 194 cv 0.002 M GLN 195 cv 0.004 M TYR 196 cv 0.002 M TYR 197 cv 0.000

5 10 15 20 M ARG 198 cv 0.258 M ILE 199 cv 0.299 M GLU 202 cv 0.001 M ASP 203 cv 0.018

5 10 15 20 M ARG 206 cv 0.001 M LEU 207 cv 0.146 M PHE 208 cv 0.001 M LEU 210 cv 0.000

5 10 15 20 M GLN 212 cv 0.001

0 60 120 180 240 300

M ASP 216 cv 0.101

0 60 120 180 240 300

M GLU 217 cv 0.535

0 60 120 180 240 300 360

M HIS 218 cv 0.372

Chi-2 (degrees)

Frequency

cv = Circular Variance (low values signify high clustering of the data points). Accessible Buried